Copyright: The Linksys Group Inc.


LINKSYS 10M Family Adapter
The Linksys Group Inc. 10M Ethernet Adapter Products

LNEPCI II Ethernet Adapter


10M LINKSYS LNEPCI II Ethernet Adapter
The Linksys Group Inc. LNEPCI II Ethernet Adapter Introduce

The LNEPCI II Ethernet Adapter is a network card using a

single-chip controller which is compliant to the

PCI Local Bus specification (Revision 2.0).  It:

Fully complies with the IEEE 802.3 standard

Uses the CSMA/CD protocol

Supports 32-bit data path width

Supports the IEEE 802.3 10Base-2 and 10Base-T

standard network interfaces

Supports media type auto-detection

Compatible with Novell NE2000 family

Performs Bus Slave architecture which provides

better compatibility

Provides one LED to indicate the link status of

the UTP connection and the activities of the network

Supports several prevalent network operating systems,

such as Novell NetWare, Personal NetWare,

IBM LAN Server, Microsoft LAN Manager,

Windows NT/95, Windows for Workgroups,

and so on

Provides an optional RPL Remote Boot ROM for RPL

servers, such as Novell NetWare 3.12/4.x,

Personal NetWare, Microsoft LAN Manager,

IBM LAN Server, LANtastic 5.0/6.0, Banyan VINES 4.11

and later, etc.

See Also

Driver Parameters


Driver Parameters

Use this dialog box to setup the 10M LNEPCI II Produce Adapter.

Ethernet ID

Bus Type

Number


Ethernet ID

This is the Ethernet MAC address of the card.  When there

are more than one card on the system, this is required

for drivers to identify each card.

You can use the diagnostic program provided in the shipped

driver diskette for the ID number.


Bus Type

Select “IISA if you are using the PnP Ethernet Adapter as

a Jumperless or Plug and Play Mod ISA Ethernet Adapter.

Select “PPCI if you are using the LNEPCI II Ethernet Adapter.

Select “PDon’t Choose this item.


Number

This is required when the bus bridge device(s) is used.

Try your card and make sure which bus it is plugged in.